en	[[!meta robots="noindex"]]

en	The *Unsafe Browser* does not use Tor. The websites that you visit can see your real IP address.
es	El *Navegador No Seguro* no utiliza Tor. Los sitios web que visitas pueden ver tu dirección IP real.

en	This is why we recommend that you:
es	Por eso te recomendamos que:

en	Only use the *Unsafe Browser* to sign in to a network using a captive portal or [[browse trusted web pages on the local network|advanced_topics/lan#browser]].

en	- Close the *Unsafe Browser* after signing in to the network.

en	It is particularly important that you close the Unsafe Browser if you use accessibility features like the Screen Keyboard or the Screen Reader. If you keep the Unsafe Browser open, a very advanced network attacker might use it to deanonymize you.